---
title: Collecting page data timed out after multiple attempts
---

## Why This Error Occurred

Next.js tries to restart the worker pool of the page data collection when no progress happens for a while, to avoid hanging builds.

When restarted it will retry all uncompleted jobs, but if a job was unsuccessfully attempted multiple times, this will lead to an error.

## Possible Ways to Fix It

- Make sure that there is no infinite loop during execution.
- Make sure all Promises in `getStaticPaths` `resolve` or `reject` correctly.
- Avoid very long timeouts for network requests.
- Increase the timeout by changing the `config.staticPageGenerationTimeout` configuration option (default `60` in seconds).

## Useful Links

- [`getStaticPaths`](/docs/pages/building-your-application/data-fetching/get-static-paths)
- [`getStaticProps`](/docs/pages/building-your-application/data-fetching/get-static-props)
