---
title: Opt-out of Automatic Static Optimization
---

## Why This Warning Occurred

You are using `getInitialProps` in your [Custom `<App>`](/docs/pages/building-your-application/routing/custom-app).

This causes **all pages** to be executed on the server -- disabling [Automatic Static Optimization](/docs/pages/building-your-application/rendering/automatic-static-optimization).

## Possible Ways to Fix It

Be sure you meant to use `getInitialProps` in `pages/_app`!
There are some valid use cases for this, but it is often better to handle `getInitialProps` on a _per-page_ basis.

If you previously copied the [Custom `<App>`](/docs/pages/building-your-application/routing/custom-app) example, you may be able to remove your `getInitialProps`.

The following `getInitialProps` does nothing and may be removed:

```jsx filename="pages/_app.js"
class MyApp extends App {
  // Remove me, I do nothing!
  static async getInitialProps({ Component, ctx }) {
    let pageProps = {}

    if (Component.getInitialProps) {
      pageProps = await Component.getInitialProps(ctx)
    }

    return { pageProps }
  }

  render() {
    // ...
  }
}
```
