---
title: Invalid Script
---

## Why This Error Occurred

Somewhere in your application, you are using the `next/script` component without including an inline script or `src` attribute.

## Possible Ways to Fix It

Look for any usage of the `next/script` component and make sure that `src` is provided or an inline script is used.

**Compatible `src` attribute**

```jsx
<Script src="https://example.com/analytics.js" />
```

**Compatible inline script with curly braces**

```jsx
<Script id="show-banner">
  {`document.getElementById('banner').classList.remove('hidden')`}
</Script>
```

**Compatible inline script with `dangerouslySetInnerHtml`**

```jsx
<Script
  id="show-banner"
  dangerouslySetInnerHTML={{
    __html: `document.getElementById('banner').classList.remove('hidden')`,
  }}
/>
```

## Useful Links

- [Script Component in Documentation](/docs/pages/guides/scripts)
