---
title: Redirect During getStaticProps Prerendering
---

## Why This Error Occurred

The `redirect` value was returned from `getStaticProps` during prerendering which is invalid.

## Possible Ways to Fix It

Remove any paths that result in a redirect from being prerendered in `getStaticPaths` and enable `fallback: true` to handle redirecting for these pages.

## Useful Links

- [Data Fetching Documentation](/docs/pages/building-your-application/data-fetching/get-static-props)
