---
title: 'Missing specified subset for a `next/font/google` font'
---

## Why This Error Occurred

Preload is enabled for a font that is missing a specified subset.

## Possible Ways to Fix It

### Specify which subsets to preload for that font.

```js filename="example.js"
const inter = Inter({ subsets: ['latin'] })
```

> **Note**: previously it was possible to specify default subsets in your `next.config.js` with the `experimental.fontLoaders` option, but this is no longer supported.

### Disable preloading for that font

If it's not possible to preload your intended subset you can disable preloading.

```js filename="example.js"
const notoSansJapanese = Noto_Sans_JP({
  weight: '400',
  preload: false,
})
```

## Useful Links

- [Specifying a subset](/docs/pages/api-reference/components/font#specifying-a-subset)
