---
title: Rendering Without Starting Slash
---

## Why This Error Occurred

When calling `app.render(req, res, path)` the `path` did not begin with a slash (`/`). This causes unexpected behavior and should be corrected.

## Possible Ways to Fix It

Make sure the `path` being passed to `app.render` always starts with a slash (`/`)
